From c7890dd59f6e0c9cd58bf30ba3ca290f392fa8c8 Mon Sep 17 00:00:00 2001
From: moetunes <moetunes111@gmail.com>
Date: Sat, 26 Nov 2011 10:10:52 +1000
Subject: Added a click to focus option

---
 src/config.h.def | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'src/config.h.def')

diff --git a/src/config.h.def b/src/config.h.def
index fed94d4..e50253e 100644
--- a/src/config.h.def
+++ b/src/config.h.def
@@ -1,4 +1,4 @@
- /* config.h for dminiwm.c [ 0.1.7 ]
+ /* config.h for dminiwm.c [ 0.1.8 ]
  *
  *  Started from catwm 31/12/10
  *  Bad window error checking and numlock checking used from
@@ -35,6 +35,7 @@
 #define DEFAULT_MODE    0  /* 0=Vertical, 1=Fullscreen 2=Horizontal 3=grid*/
 #define FOLLOW_MOUSE    0  /* 1=Don't 0=Focus the window the mouse just entered */
 #define FOLLOW_WINDOW   0  /* 1=Don't 0=Follow the window when moved to a different desktop */
+#define CLICK_TO_FOCUS  0  /* 1=Don't 0=Focus an unfocused window when clicked */
 #define DESKTOPS        6  /* Must edit DESKTOPCHANGE keys to suit */
 
 // Colors
-- 
cgit v1.3.1

