From b5aa24f3fd96b06e08832b2bdb9759d7cb2308b0 Mon Sep 17 00:00:00 2001
From: Ivan Kanakarakis <ivan.kanak@gmail.com>
Date: Fri, 25 Nov 2011 14:13:15 +0200
Subject: revert buggy patch - retval needs more work

---
 src/config.h.def | 4 +---
 1 file changed, 1 insertion(+), 3 deletions(-)

(limited to 'src/config.h.def')

diff --git a/src/config.h.def b/src/config.h.def
index 99f485e..8ae8f26 100644
--- a/src/config.h.def
+++ b/src/config.h.def
@@ -1,6 +1,6 @@
  /* config.h for dminiwm.c [ 0.1.7 ]
  *
- *  Started from catwm 31/12/10
+ *  Started from catwm 31/12/10 
  *  Bad window error checking and numlock checking used from
  *  2wm at http://hg.suckless.org/2wm/
  *
@@ -96,8 +96,6 @@ static key keys[] = {
     {  MOD1|ShiftMask,   XK_h,          switch_horizontal, {NULL}},
     {  MOD1|ShiftMask,   XK_m,          switch_fullscreen, {NULL}},
     {  MOD1|ShiftMask,   XK_v,          switch_vertical,   {NULL}},
-    {  MOD1|ShiftMask,   XK_r,          quit,              {.i = 0}}, /* restart */
-    {  MOD1|ShiftMask,   XK_q,          quit,              {.i = 1}}, /* quit    */
 // Control + alt + shortcut
     {  MOD1|ControlMask, XK_q,          quit,              {NULL}},
     {  MOD1|ControlMask, XK_r,          spawn,             {.com = rebootcmd}},
-- 
cgit v1.3.1

